spool D:\ORANT\DES_81\admin\unito\create\createdb
set echo on
connect INTERNAL/oracle
startup nomount pfile="D:\ORANT\DES_81\admin\unito\pfile\initunito.ora"
CREATE DATABASE unito
LOGFILE 'D:\ORANT\DES_81\oradata\unito\redo01.log' SIZE 1024K,
    'D:\ORANT\DES_81\oradata\unito\redo02.log' SIZE 1024K,
    'D:\ORANT\DES_81\oradata\unito\redo03.log' SIZE 1024K
MAXLOGFILES 32
MAXLOGMEMBERS 2
MAXLOGHISTORY 1
DATAFILE 'D:\ORANT\DES_81\oradata\unito\system01.dbf' SIZE 58M  REUSE AUTOEXTEND ON NEXT 640K
MAXDATAFILES 254
MAXINSTANCES 1
CHARACTER SET WE8ISO8859P1
NATIONAL CHARACTER SET WE8ISO8859P1;
spool off
